---
thumbnail: /thumbnails/products/solian.webp
title: Solian
description: Solar Network 的官方跨平台客户端
author: littlesheep
url: https://sn.solsynth.dev
downloads:
  - title: macOS
    icon: mdi-apple
    desc: macOS 12 or above, via Testflight
    url: https://testflight.apple.com/join/YJ0lmN6O
  - title: iOS
    icon: mdi-apple-ios
    desc: iOS 12 or above, via Testflight上
    url: https://testflight.apple.com/join/YJ0lmN6O
  - title: Android
    icon: mdi-android
    desc: Android 9 or above
    url: https://files.solsynth.dev/production01/solian/app-arm64-v8a-release.apk
  - title: Web
    icon: mdi-web
    desc: Web-based version with support for major browsers
    url: https://sn.solsynth.dev
---

Solian is the official cross-platform client for Solar Network, offering the best support and most advanced features.
It lets you get the most out of Solar Network.

:embed-download-link{:items='downloads'}
